-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.338638707451
cusum  =  0.202706713461
eta  =  0.533299707361
hl_amp_ratio  =  0.20172298946
kurtosis  =  -0.455260696377
n_points  =  169
period  =  0.597572221835
period_SNR  =  23.2408196945
period_log10FAP  =  -21.2205226449
period_uncertainty  =  0.000166512647953
phase_cusum  =  0.335793630706
phase_eta  =  0.0948237995763
phi21  =  0.83780241423
phi31  =  -1.50959557021
quartile31  =  0.47
r21  =  0.466249751113
r31  =  0.288652054135
shapiro_w  =  0.838271260262
skewness  =  -0.933333035894
slope_per10  =  -0.280939462242
slope_per90  =  0.387699999846
stetson_k  =  0.657802481563
weighted_mean  =  14.9578873695
weighted_std  =  0.288268953033
