-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.312325052363
cusum  =  0.113761204274
eta  =  0.506036304941
hl_amp_ratio  =  1.20146951403
kurtosis  =  -1.22725928628
n_points  =  359
period  =  0.650175808696
period_SNR  =  41.6044645214
period_log10FAP  =  -45.6592407729
period_uncertainty  =  0.000117776941739
phase_cusum  =  0.253830855774
phase_eta  =  0.188231265221
phi21  =  3.98760308268
phi31  =  5.020688936
quartile31  =  0.465
r21  =  0.381967629143
r31  =  0.311926289162
shapiro_w  =  0.930646717548
skewness  =  -0.111704782337
slope_per10  =  -0.11940391304
slope_per90  =  0.265483340869
stetson_k  =  0.868674560419
weighted_mean  =  15.3956276175
weighted_std  =  0.262019851169
