-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.356694524176
cusum  =  0.0849244601013
eta  =  0.646211925395
hl_amp_ratio  =  0.26006417856
kurtosis  =  -0.825657302077
n_points  =  331
period  =  0.616908147887
period_SNR  =  48.3376382403
period_log10FAP  =  -42.9074318531
period_uncertainty  =  0.000108602944554
phase_cusum  =  0.296629887125
phase_eta  =  0.210809215973
phi21  =  0.931303544143
phi31  =  1.9098205211
quartile31  =  0.55
r21  =  0.473674484425
r31  =  0.301717344781
shapiro_w  =  0.872349202633
skewness  =  -0.744370539539
slope_per10  =  -0.145307040505
slope_per90  =  0.205102808827
stetson_k  =  0.717032546637
weighted_mean  =  14.8247530924
weighted_std  =  0.330377644964
