-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.56


######### Lightcurve features #########

amplitude  =  0.342133851893
cusum  =  0.104203646373
eta  =  0.472844382872
hl_amp_ratio  =  0.261064386556
kurtosis  =  -0.172733899742
n_points  =  372
period  =  0.853895322804
period_SNR  =  45.9874716195
period_log10FAP  =  -49.9639502328
period_uncertainty  =  0.000197186256816
phase_cusum  =  0.274987063635
phase_eta  =  0.225666358729
phi21  =  -2.44193310878
phi31  =  -1.95976936984
quartile31  =  0.37
r21  =  0.384761235274
r31  =  0.252607340637
shapiro_w  =  0.851773381233
skewness  =  -1.02116926171
slope_per10  =  -0.191943398844
slope_per90  =  0.348149982747
stetson_k  =  0.690341905503
weighted_mean  =  13.7443888166
weighted_std  =  0.282429036955
