-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.71


######### Lightcurve features #########

amplitude  =  0.277997122871
cusum  =  0.221044135889
eta  =  0.737487657785
hl_amp_ratio  =  0.279763545593
kurtosis  =  -0.0136407669405
n_points  =  128
period  =  0.575716223633
period_SNR  =  20.5996692495
period_log10FAP  =  -10.7782205019
period_uncertainty  =  0.00015718142485
phase_cusum  =  0.3001025829
phase_eta  =  0.331460415048
phi21  =  1.01110897894
phi31  =  5.01305778641
quartile31  =  0.31
r21  =  0.517798593095
r31  =  0.336926478306
shapiro_w  =  0.91441231966
skewness  =  -0.748917465241
slope_per10  =  -0.24100914555
slope_per90  =  0.542518232155
stetson_k  =  0.669842294114
weighted_mean  =  15.111629107
weighted_std  =  0.238505717063
