-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.235659134825
cusum  =  0.196227256704
eta  =  0.432957725712
hl_amp_ratio  =  0.454232919945
kurtosis  =  -0.128895018099
n_points  =  181
period  =  0.568577572437
period_SNR  =  23.7851095096
period_log10FAP  =  -18.5019404586
period_uncertainty  =  0.000210216259234
phase_cusum  =  0.218837954871
phase_eta  =  0.229790553638
phi21  =  1.05857262332
phi31  =  2.28309087064
quartile31  =  0.23
r21  =  0.549429308905
r31  =  0.299840242849
shapiro_w  =  0.924843966961
skewness  =  -0.825882251341
slope_per10  =  -0.199060267699
slope_per90  =  0.219498523981
stetson_k  =  0.676984046892
weighted_mean  =  15.9850640569
weighted_std  =  0.203778648419
