-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.1832289165
cusum  =  0.0884958241981
eta  =  0.66896083034
hl_amp_ratio  =  0.618680119817
kurtosis  =  -0.931375889758
n_points  =  245
period  =  0.642527693328
period_SNR  =  37.714704812
period_log10FAP  =  -30.6885100007
period_uncertainty  =  0.000141963704086
phase_cusum  =  0.261507184867
phase_eta  =  0.362897863728
phi21  =  4.23451977904
phi31  =  5.92905131292
quartile31  =  0.25
r21  =  0.375011598119
r31  =  0.166594090373
shapiro_w  =  0.955678284168
skewness  =  -0.332251473626
slope_per10  =  -0.230920539627
slope_per90  =  0.211056644871
stetson_k  =  0.814103115843
weighted_mean  =  14.8039127152
weighted_std  =  0.147693110559
