-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.348522315645
cusum  =  0.149165817979
eta  =  0.570167106331
hl_amp_ratio  =  0.404742602947
kurtosis  =  -0.701587006464
n_points  =  317
period  =  0.624070390536
period_SNR  =  41.6067619647
period_log10FAP  =  -36.8910241539
period_uncertainty  =  0.000177848511986
phase_cusum  =  0.22653419437
phase_eta  =  0.357955119079
phi21  =  0.925719799129
phi31  =  2.03211426085
quartile31  =  0.49
r21  =  0.498851480764
r31  =  0.221852246556
shapiro_w  =  0.914219021797
skewness  =  -0.656609025612
slope_per10  =  -0.114776522929
slope_per90  =  0.208270524861
stetson_k  =  0.74546844556
weighted_mean  =  14.5626300004
weighted_std  =  0.321593498016
