-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.498544255404
cusum  =  0.147771677466
eta  =  0.518584592066
hl_amp_ratio  =  0.470068587231
kurtosis  =  -0.319248324362
n_points  =  255
period  =  0.600355424778
period_SNR  =  37.7482315476
period_log10FAP  =  -33.4731671137
period_uncertainty  =  0.000144574383251
phase_cusum  =  0.312182260901
phase_eta  =  0.0786762169849
phi21  =  3.89397995366
phi31  =  4.75671236299
quartile31  =  0.525
r21  =  0.422098458024
r31  =  0.332379452214
shapiro_w  =  0.869725108147
skewness  =  -0.896413578349
slope_per10  =  -0.154215620889
slope_per90  =  0.2487074012
stetson_k  =  0.792962483787
weighted_mean  =  11.8214540648
weighted_std  =  0.385130428339
