-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.332695464368
cusum  =  0.100272054511
eta  =  0.555510734765
hl_amp_ratio  =  0.419824760929
kurtosis  =  -0.65157317702
n_points  =  633
period  =  0.624492027613
period_SNR  =  62.1359801734
period_log10FAP  =  -77.8601433497
period_uncertainty  =  0.000102651726578
phase_cusum  =  0.246585047232
phase_eta  =  0.359271915273
phi21  =  0.990709907337
phi31  =  2.06210842666
quartile31  =  0.51
r21  =  0.524620600828
r31  =  0.295933512933
shapiro_w  =  0.912577629089
skewness  =  -0.703386717962
slope_per10  =  -0.0768689414985
slope_per90  =  0.103905692535
stetson_k  =  0.772194842945
weighted_mean  =  13.9597739874
weighted_std  =  0.310141669443
