-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.195686222862
cusum  =  0.199317975939
eta  =  0.413369689774
hl_amp_ratio  =  0.61116645793
kurtosis  =  -0.833087465758
n_points  =  356
period  =  0.739337762667
period_SNR  =  43.9742997652
period_log10FAP  =  -48.4481764818
period_uncertainty  =  0.000153262394936
phase_cusum  =  0.271792592933
phase_eta  =  0.196672389545
phi21  =  1.26525116604
phi31  =  -0.471191122044
quartile31  =  0.2325
r21  =  0.430066776418
r31  =  0.20249967178
shapiro_w  =  0.946930646896
skewness  =  -0.467901618259
slope_per10  =  -0.204650116918
slope_per90  =  0.316672519494
stetson_k  =  0.813150036858
weighted_mean  =  14.0010029718
weighted_std  =  0.154732060002
