-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.180372716175
cusum  =  0.0845346312276
eta  =  0.646700903806
hl_amp_ratio  =  0.995740699035
kurtosis  =  -1.16780262356
n_points  =  342
period  =  0.695809205673
period_SNR  =  50.9072159365
period_log10FAP  =  -54.1558237595
period_uncertainty  =  0.000161765943106
phase_cusum  =  0.24876413098
phase_eta  =  0.155394202214
phi21  =  4.57764273896
phi31  =  3.01346439628
quartile31  =  0.2675
r21  =  0.363995893717
r31  =  0.127054413207
shapiro_w  =  0.954782366753
skewness  =  0.0990856428143
slope_per10  =  -0.214352893426
slope_per90  =  0.169415603274
stetson_k  =  0.875393583856
weighted_mean  =  16.5050878544
weighted_std  =  0.147937485772
