-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.17057303165
cusum  =  0.120429266956
eta  =  0.706934296755
hl_amp_ratio  =  0.698063008938
kurtosis  =  2.30004841809
n_points  =  209
period  =  0.130976887876
period_SNR  =  12.8806945274
period_log10FAP  =  -8.59586304679
period_uncertainty  =  3.74251758674e-06
phase_cusum  =  0.196297085271
phase_eta  =  1.52893889215
phi21  =  -1.25124164418
phi31  =  -3.23731349743
quartile31  =  0.26
r21  =  0.172534300511
r31  =  0.164937440379
shapiro_w  =  0.967409610748
skewness  =  -0.41113062082
slope_per10  =  -0.0178609308853
slope_per90  =  0.0116569361685
stetson_k  =  0.741958784179
weighted_mean  =  10.8959330144
weighted_std  =  0.221953517508
