-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.23


######### Lightcurve features #########

amplitude  =  0.32296946154
cusum  =  0.274867571586
eta  =  0.479757442526
hl_amp_ratio  =  1.73804943034
kurtosis  =  -0.794442466167
n_points  =  236
period  =  0.79320802139
period_SNR  =  42.6079672729
period_log10FAP  =  -39.047060537
period_uncertainty  =  0.000287524465471
phase_cusum  =  0.312346563138
phase_eta  =  0.107401003654
phi21  =  -1.71800440428
phi31  =  -3.85252027568
quartile31  =  0.44
r21  =  0.186801799367
r31  =  0.0447609804693
shapiro_w  =  0.927402377129
skewness  =  0.173812964314
slope_per10  =  -0.33075578511
slope_per90  =  0.443139037307
stetson_k  =  0.820062037588
weighted_mean  =  15.5703936298
weighted_std  =  0.232862827645
