-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.76


######### Lightcurve features #########

amplitude  =  0.36621425557
cusum  =  0.135046127427
eta  =  0.589716681759
hl_amp_ratio  =  0.2642892706
kurtosis  =  -0.696437473531
n_points  =  172
period  =  0.61579606979
period_SNR  =  22.3996321725
period_log10FAP  =  -21.5438815557
period_uncertainty  =  0.000107005645312
phase_cusum  =  0.284600366056
phase_eta  =  0.202092517663
phi21  =  0.715227751617
phi31  =  1.81947221877
quartile31  =  0.53
r21  =  0.443949078097
r31  =  0.259317109588
shapiro_w  =  0.853211641312
skewness  =  -0.846429704354
slope_per10  =  -0.0893791192515
slope_per90  =  0.563999987207
stetson_k  =  0.718343336452
weighted_mean  =  13.2934213099
weighted_std  =  0.328393740937
