-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.263806172782
cusum  =  0.139718755486
eta  =  0.568946078419
hl_amp_ratio  =  0.564116478469
kurtosis  =  -0.849532809676
n_points  =  248
period  =  0.687698629198
period_SNR  =  35.5386163839
period_log10FAP  =  -30.1779467817
period_uncertainty  =  0.00018971745737
phase_cusum  =  0.30309209756
phase_eta  =  0.169105174896
phi21  =  -2.10856813684
phi31  =  -3.92403649436
quartile31  =  0.4
r21  =  0.520700196211
r31  =  0.280030184106
shapiro_w  =  0.952093720436
skewness  =  -0.443398586542
slope_per10  =  -0.198049346024
slope_per90  =  0.39800000377
stetson_k  =  0.8048192949
weighted_mean  =  14.0582527233
weighted_std  =  0.241333355838
