-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.255914048157
cusum  =  0.0929953486477
eta  =  0.539971042486
hl_amp_ratio  =  0.38528949526
kurtosis  =  -0.491269168867
n_points  =  417
period  =  0.58031718255
period_SNR  =  51.2773245944
period_log10FAP  =  -56.3237795087
period_uncertainty  =  0.000114899129877
phase_cusum  =  0.263245116703
phase_eta  =  0.127395166742
phi21  =  4.00502590866
phi31  =  5.12396433121
quartile31  =  0.31
r21  =  0.506909388812
r31  =  0.291515662764
shapiro_w  =  0.921296656132
skewness  =  -0.716041225185
slope_per10  =  -0.14446911777
slope_per90  =  0.193733699487
stetson_k  =  0.735786595116
weighted_mean  =  14.8686313726
weighted_std  =  0.218630928197
