-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.250587802802
cusum  =  0.225856994982
eta  =  0.519399408302
hl_amp_ratio  =  0.678774237326
kurtosis  =  -0.744724819808
n_points  =  276
period  =  0.573228629244
period_SNR  =  36.1696132701
period_log10FAP  =  -33.5775857844
period_uncertainty  =  0.000107736245363
phase_cusum  =  0.286430261633
phase_eta  =  0.23160167906
phi21  =  0.972753089369
phi31  =  2.31986812771
quartile31  =  0.31
r21  =  0.484855437762
r31  =  0.344116886195
shapiro_w  =  0.969656825066
skewness  =  -0.291250639949
slope_per10  =  -0.111836654518
slope_per90  =  0.175466667861
stetson_k  =  0.803774354132
weighted_mean  =  17.334552216
weighted_std  =  0.217266818733
