-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.47


######### Lightcurve features #########

amplitude  =  0.204276121307
cusum  =  0.241923487613
eta  =  0.660527079756
hl_amp_ratio  =  1.85283260036
kurtosis  =  -1.35921881408
n_points  =  93
period  =  0.825049322571
period_SNR  =  16.8303484234
period_log10FAP  =  -10.0142684354
period_uncertainty  =  0.000158556616324
phase_cusum  =  0.296004267251
phase_eta  =  0.143711715831
phi21  =  1.19609378942
phi31  =  2.90858874206
quartile31  =  0.31
r21  =  0.396999205877
r31  =  0.259194023246
shapiro_w  =  0.909479379654
skewness  =  0.304297990016
slope_per10  =  -0.46312578728
slope_per90  =  0.87939999532
stetson_k  =  0.852569678489
weighted_mean  =  14.265625
weighted_std  =  0.168008330615
