-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.333840515284
cusum  =  0.15298586536
eta  =  0.585946037496
hl_amp_ratio  =  0.651350041233
kurtosis  =  -0.917897409476
n_points  =  220
period  =  0.628859696197
period_SNR  =  26.8237775072
period_log10FAP  =  -26.4726788568
period_uncertainty  =  0.000105442607842
phase_cusum  =  0.270046014976
phase_eta  =  0.300310188108
phi21  =  -2.19661621193
phi31  =  -4.04204944378
quartile31  =  0.4325
r21  =  0.391395034459
r31  =  0.244051345021
shapiro_w  =  0.930682420731
skewness  =  -0.50260701519
slope_per10  =  -0.136676511974
slope_per90  =  0.461999997497
stetson_k  =  0.820024963443
weighted_mean  =  14.4041413892
weighted_std  =  0.272422431269
