-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.350631679919
cusum  =  0.108032198242
eta  =  0.595725218839
hl_amp_ratio  =  0.346972578799
kurtosis  =  -0.311602137802
n_points  =  252
period  =  0.502577083357
period_SNR  =  36.7907489878
period_log10FAP  =  -31.0139819033
period_uncertainty  =  0.000101337703756
phase_cusum  =  0.274086896936
phase_eta  =  0.240091410374
phi21  =  -2.4739691582
phi31  =  -1.46593449336
quartile31  =  0.38
r21  =  0.502482305073
r31  =  0.235379241558
shapiro_w  =  0.892279863358
skewness  =  -0.867242160487
slope_per10  =  -0.0858587013148
slope_per90  =  0.195116673853
stetson_k  =  0.71172347612
weighted_mean  =  14.1372523541
weighted_std  =  0.290516995867
