-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.349956016962
cusum  =  0.193382964941
eta  =  0.743717440118
hl_amp_ratio  =  0.83934884241
kurtosis  =  -0.664442037679
n_points  =  324
period  =  0.643260240507
period_SNR  =  35.663468606
period_log10FAP  =  -31.209347864
period_uncertainty  =  0.000140644327219
phase_cusum  =  0.260726784839
phase_eta  =  0.488263074733
phi21  =  0.909748906266
phi31  =  2.05236794058
quartile31  =  0.48
r21  =  0.527830634148
r31  =  0.290906340228
shapiro_w  =  0.987113893032
skewness  =  -0.0409513947002
slope_per10  =  -0.0418566471495
slope_per90  =  0.0596273193553
stetson_k  =  0.809648154782
weighted_mean  =  18.5470907588
weighted_std  =  0.307891857851
