-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.133505611732
cusum  =  0.10497986073
eta  =  0.890088192
hl_amp_ratio  =  0.775877249607
kurtosis  =  -0.237839749555
n_points  =  312
period  =  0.611905335261
period_SNR  =  31.7873073558
period_log10FAP  =  -27.4429168412
period_uncertainty  =  0.000102889654269
phase_cusum  =  0.219009649167
phase_eta  =  0.542366020305
phi21  =  1.30516948286
phi31  =  2.54819156399
quartile31  =  0.1825
r21  =  0.59476585778
r31  =  0.386480191699
shapiro_w  =  0.986142992973
skewness  =  0.0253712879087
slope_per10  =  -0.105477904453
slope_per90  =  0.194788046399
stetson_k  =  0.80787975766
weighted_mean  =  16.4673606083
weighted_std  =  0.132515321995
