-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.71


######### Lightcurve features #########

amplitude  =  0.266075641045
cusum  =  0.273732620526
eta  =  0.543009120907
hl_amp_ratio  =  4.99619644671
kurtosis  =  1.87921750914
n_points  =  388
period  =  1.3748327367
period_SNR  =  11.9031944283
period_log10FAP  =  -5.61357141533
period_uncertainty  =  0.000523945475768
phase_cusum  =  0.139382514186
phase_eta  =  1.27208577697
phi21  =  -4.00130551441
phi31  =  -5.16355656572
quartile31  =  0.24
r21  =  0.392553866522
r31  =  0.255207830462
shapiro_w  =  0.707387506962
skewness  =  1.77246328822
slope_per10  =  -0.106741667454
slope_per90  =  0.0992947223843
stetson_k  =  0.550014377662
weighted_mean  =  18.0315731015
weighted_std  =  0.472550455503
