-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.260676664345
cusum  =  0.122918363128
eta  =  0.645901632027
hl_amp_ratio  =  0.683997097184
kurtosis  =  -0.936937124201
n_points  =  313
period  =  0.692899522975
period_SNR  =  34.1373234298
period_log10FAP  =  -31.8178472743
period_uncertainty  =  0.000131990922568
phase_cusum  =  0.230651219857
phase_eta  =  0.635632803295
phi21  =  0.936601282942
phi31  =  1.86060433654
quartile31  =  0.44
r21  =  0.459710396922
r31  =  0.154769875429
shapiro_w  =  0.959827721119
skewness  =  -0.339123525827
slope_per10  =  -0.101356803905
slope_per90  =  0.101249996806
stetson_k  =  0.802029956193
weighted_mean  =  17.0348151423
weighted_std  =  0.273809649455
