-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.295289255648
cusum  =  0.14795213765
eta  =  0.861584935035
hl_amp_ratio  =  0.652597584552
kurtosis  =  -0.221038346638
n_points  =  158
period  =  0.58659295866
period_SNR  =  20.7504399
period_log10FAP  =  -10.1436056475
period_uncertainty  =  0.000164469719893
phase_cusum  =  0.276905942216
phase_eta  =  0.636497346864
phi21  =  -1.97831703966
phi31  =  -1.15309496145
quartile31  =  0.42
r21  =  0.436558499146
r31  =  0.454515539563
shapiro_w  =  0.979851424694
skewness  =  -0.296259917341
slope_per10  =  -0.120150148485
slope_per90  =  0.135538473581
stetson_k  =  0.744607456841
weighted_mean  =  17.2766367442
weighted_std  =  0.325971304602
