-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.272731690204
cusum  =  0.0896403066624
eta  =  0.509394128499
hl_amp_ratio  =  0.42540261526
kurtosis  =  -0.435866493839
n_points  =  363
period  =  0.600906880016
period_SNR  =  36.8614129163
period_log10FAP  =  -39.2248857873
period_uncertainty  =  0.000100479382005
phase_cusum  =  0.320787127005
phase_eta  =  0.742158982437
phi21  =  -2.34258625323
phi31  =  -1.92663636556
quartile31  =  0.38
r21  =  0.329679369454
r31  =  0.0589288582841
shapiro_w  =  0.910599827766
skewness  =  -0.797091376961
slope_per10  =  -0.0794785580612
slope_per90  =  0.161479997928
stetson_k  =  0.74089241001
weighted_mean  =  14.4606936977
weighted_std  =  0.269828125683
