-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.69


######### Lightcurve features #########

amplitude  =  0.368816690219
cusum  =  0.229688806631
eta  =  0.524804696028
hl_amp_ratio  =  0.868966398622
kurtosis  =  -1.35238931366
n_points  =  135
period  =  0.511159898117
period_SNR  =  19.646656931
period_log10FAP  =  -14.8492788915
period_uncertainty  =  0.000113213714993
phase_cusum  =  0.26764580763
phase_eta  =  0.311280752099
phi21  =  -2.49805285721
phi31  =  -4.50401980378
quartile31  =  0.625
r21  =  0.416232862147
r31  =  0.157058824195
shapiro_w  =  0.908908188343
skewness  =  -0.213096125552
slope_per10  =  -0.177339555462
slope_per90  =  0.257299998775
stetson_k  =  0.886842537971
weighted_mean  =  14.9988614329
weighted_std  =  0.331991995684
