-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  0.207738932684
cusum  =  0.209237127791
eta  =  0.707504758383
hl_amp_ratio  =  0.550053046369
kurtosis  =  -0.619818601193
n_points  =  99
period  =  0.354342680014
period_SNR  =  15.525754457
period_log10FAP  =  -8.45886341139
period_uncertainty  =  5.47134729213e-05
phase_cusum  =  0.31263270905
phase_eta  =  0.971548963013
phi21  =  -2.30514839329
phi31  =  -2.82151828225
quartile31  =  0.27
r21  =  0.189387207733
r31  =  0.0454950902883
shapiro_w  =  0.966959536076
skewness  =  -0.4086606235
slope_per10  =  -0.211261113413
slope_per90  =  0.141950997738
stetson_k  =  0.795572986104
weighted_mean  =  15.8847792273
weighted_std  =  0.175588334002
