-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.202197409441
cusum  =  0.19884841634
eta  =  0.713637005198
hl_amp_ratio  =  0.892133051056
kurtosis  =  -0.77770960729
n_points  =  113
period  =  0.599070929342
period_SNR  =  15.4772488773
period_log10FAP  =  -9.85879644163
period_uncertainty  =  0.000182437000191
phase_cusum  =  0.321905245268
phase_eta  =  0.265033832252
phi21  =  1.04854597231
phi31  =  2.73244476319
quartile31  =  0.33
r21  =  0.651335587863
r31  =  0.318051051266
shapiro_w  =  0.960391938686
skewness  =  -0.240779892086
slope_per10  =  -0.460935995979
slope_per90  =  0.65239998512
stetson_k  =  0.855264462173
weighted_mean  =  15.2875658344
weighted_std  =  0.199709093699
