-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.304364433785
cusum  =  0.104394194545
eta  =  0.514540930433
hl_amp_ratio  =  0.60053865189
kurtosis  =  -0.40339894446
n_points  =  436
period  =  0.634772286349
period_SNR  =  51.0188935577
period_log10FAP  =  -54.9635524146
period_uncertainty  =  0.000113782947216
phase_cusum  =  0.253478479418
phase_eta  =  0.0684745071451
phi21  =  -2.26136257758
phi31  =  -4.12293414686
quartile31  =  0.39
r21  =  0.495736790438
r31  =  0.381610734205
shapiro_w  =  0.939559221268
skewness  =  -0.661633275837
slope_per10  =  -0.110911181111
slope_per90  =  0.151741776982
stetson_k  =  0.809048782812
weighted_mean  =  13.3051351777
weighted_std  =  0.2715356508
