-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.17439624124
cusum  =  0.118884675484
eta  =  0.635366396595
hl_amp_ratio  =  0.63252234208
kurtosis  =  -0.612207248969
n_points  =  416
period  =  0.354972461996
period_SNR  =  37.4908951447
period_log10FAP  =  -39.4852635074
period_uncertainty  =  3.38120537498e-05
phase_cusum  =  0.19917163364
phase_eta  =  0.903870016903
phi21  =  -1.53798948073
phi31  =  -1.48236152863
quartile31  =  0.27
r21  =  0.280409523447
r31  =  0.128246449624
shapiro_w  =  0.952005326748
skewness  =  -0.524529073918
slope_per10  =  -0.0272749715745
slope_per90  =  0.0512048214764
stetson_k  =  0.794311051519
weighted_mean  =  13.5960355679
weighted_std  =  0.188558950628
