-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.269991430363
cusum  =  0.150614693116
eta  =  0.832015745423
hl_amp_ratio  =  0.594519974274
kurtosis  =  -0.126991581185
n_points  =  241
period  =  0.534863975321
period_SNR  =  31.2500744136
period_log10FAP  =  -22.7377142139
period_uncertainty  =  0.000139660293626
phase_cusum  =  0.31369386248
phase_eta  =  0.727092862533
phi21  =  1.04750036584
phi31  =  -0.18115238273
quartile31  =  0.38
r21  =  0.43865339727
r31  =  0.154684393524
shapiro_w  =  0.949468970299
skewness  =  -0.0824295053776
slope_per10  =  -0.103634075486
slope_per90  =  0.0948946889906
stetson_k  =  0.757786239549
weighted_mean  =  14.6015882932
weighted_std  =  0.273228907523
