-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.483514666182
cusum  =  0.252059863471
eta  =  0.420602207463
hl_amp_ratio  =  0.520821383535
kurtosis  =  -0.359623329654
n_points  =  230
period  =  0.597327415698
period_SNR  =  22.7241543927
period_log10FAP  =  -18.789975467
period_uncertainty  =  0.000105781581371
phase_cusum  =  0.198230941616
phase_eta  =  0.522468074641
phi21  =  0.66204157828
phi31  =  1.46833619617
quartile31  =  0.5475
r21  =  0.600644036516
r31  =  0.367886410214
shapiro_w  =  0.926080822945
skewness  =  -0.729329356466
slope_per10  =  -0.0599666658996
slope_per90  =  0.175733330349
stetson_k  =  0.746981939368
weighted_mean  =  11.6982788671
weighted_std  =  0.488945496511
