-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.212036988794
cusum  =  0.172195622125
eta  =  0.539873063074
hl_amp_ratio  =  1.0869042898
kurtosis  =  -1.03470437808
n_points  =  149
period  =  0.606494963817
period_SNR  =  22.9732998558
period_log10FAP  =  -16.3340797479
period_uncertainty  =  0.00013713332636
phase_cusum  =  0.278420310543
phase_eta  =  0.40412456808
phi21  =  1.34184230885
phi31  =  5.62846342606
quartile31  =  0.28
r21  =  0.373419083338
r31  =  0.188536190057
shapiro_w  =  0.968211114407
skewness  =  -0.0656510706986
slope_per10  =  -0.318616108551
slope_per90  =  0.445489022376
stetson_k  =  0.85978493187
weighted_mean  =  15.340242283
weighted_std  =  0.17222187904
