-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.328470325886
cusum  =  0.142049774035
eta  =  0.572187833851
hl_amp_ratio  =  0.232600630715
kurtosis  =  -0.365058540124
n_points  =  354
period  =  0.59848569583
period_SNR  =  47.2121555394
period_log10FAP  =  -44.8192240264
period_uncertainty  =  0.000100148211499
phase_cusum  =  0.234284261048
phase_eta  =  0.209028755962
phi21  =  3.90015148609
phi31  =  4.98664922334
quartile31  =  0.3675
r21  =  0.476897479061
r31  =  0.326887134623
shapiro_w  =  0.870621144772
skewness  =  -0.92525773547
slope_per10  =  -0.129697574758
slope_per90  =  0.20066666572
stetson_k  =  0.679564939086
weighted_mean  =  14.5249563607
weighted_std  =  0.286068849019
