-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.25


######### Lightcurve features #########

amplitude  =  0.310912214265
cusum  =  0.207988201311
eta  =  0.717739473185
hl_amp_ratio  =  0.35204756055
kurtosis  =  -0.541505302044
n_points  =  50
period  =  0.738821860917
period_SNR  =  9.85392616064
period_log10FAP  =  -3.47027937177
period_uncertainty  =  0.000382710209356
phase_cusum  =  0.361404118587
phase_eta  =  0.312990960472
phi21  =  3.7250017375
phi31  =  5.4060570608
quartile31  =  0.3025
r21  =  0.26868501485
r31  =  0.0305490896634
shapiro_w  =  0.899415493011
skewness  =  -0.770284961828
slope_per10  =  -0.866541569138
slope_per90  =  0.568330912023
stetson_k  =  0.750218932843
weighted_mean  =  13.550890411
weighted_std  =  0.193359229527
