-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.386229760661
cusum  =  0.174175181896
eta  =  0.491391434545
hl_amp_ratio  =  0.352079565694
kurtosis  =  -0.406531071367
n_points  =  351
period  =  0.573012832813
period_SNR  =  42.8951635691
period_log10FAP  =  -45.3052632968
period_uncertainty  =  0.000107238837096
phase_cusum  =  0.279118957133
phase_eta  =  0.0723875148815
phi21  =  0.797634648008
phi31  =  -1.21040121156
quartile31  =  0.42
r21  =  0.531208020062
r31  =  0.317581688315
shapiro_w  =  0.892272889614
skewness  =  -0.856859235222
slope_per10  =  -0.135214179839
slope_per90  =  0.262972315709
stetson_k  =  0.714824604258
weighted_mean  =  14.3090766002
weighted_std  =  0.315861656343
