-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.290957353676
cusum  =  0.173793128587
eta  =  0.567706145506
hl_amp_ratio  =  0.581730902686
kurtosis  =  -0.828061669229
n_points  =  257
period  =  0.545075329438
period_SNR  =  32.0812273571
period_log10FAP  =  -26.4057347428
period_uncertainty  =  0.000118590398551
phase_cusum  =  0.263442131208
phase_eta  =  0.339213309325
phi21  =  0.752291903882
phi31  =  -1.19320180687
quartile31  =  0.42
r21  =  0.448639384492
r31  =  0.346521894978
shapiro_w  =  0.937254726887
skewness  =  -0.50754346214
slope_per10  =  -0.109153448665
slope_per90  =  0.193180009209
stetson_k  =  0.802424165292
weighted_mean  =  15.0239589356
weighted_std  =  0.272140362967
