-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.3


######### Lightcurve features #########

amplitude  =  2.70137735224
cusum  =  0.431613866071
eta  =  0.569960361314
hl_amp_ratio  =  0.128069303443
kurtosis  =  -1.00923876561
n_points  =  22
period  =  0.905257802385
period_SNR  =  5.13361765887
period_log10FAP  =  -3.76995285827e-08
period_uncertainty  =  0.000205623588664
phase_cusum  =  0.290852416606
phase_eta  =  0.807911071723
phi21  =  -0.349090606483
phi31  =  -2.96218449608
quartile31  =  3.75
r21  =  0.327709766392
r31  =  0.0757301504696
shapiro_w  =  0.701738536358
skewness  =  -0.931385206062
slope_per10  =  -0.148421471672
slope_per90  =  0.259789003096
stetson_k  =  0.631638825162
weighted_mean  =  12.0665648855
weighted_std  =  1.991991129
