-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.238978280522
cusum  =  0.130206406664
eta  =  0.752453930801
hl_amp_ratio  =  0.441246173601
kurtosis  =  -0.811030755254
n_points  =  265
period  =  0.585532362984
period_SNR  =  39.1270199022
period_log10FAP  =  -30.0151485351
period_uncertainty  =  0.00011669415789
phase_cusum  =  0.198212182256
phase_eta  =  0.413381840233
phi21  =  -2.11598017134
phi31  =  -0.76880294438
quartile31  =  0.36
r21  =  0.50147572119
r31  =  0.338189865485
shapiro_w  =  0.932566344738
skewness  =  -0.548344470135
slope_per10  =  -0.113489453738
slope_per90  =  0.20514348863
stetson_k  =  0.741283406545
weighted_mean  =  16.3328504461
weighted_std  =  0.237986165306
