-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.309854905395
cusum  =  0.149431015626
eta  =  0.582850976183
hl_amp_ratio  =  0.260135289698
kurtosis  =  -0.388035883088
n_points  =  344
period  =  0.673550399046
period_SNR  =  44.184373004
period_log10FAP  =  -46.1623032063
period_uncertainty  =  0.00014607469762
phase_cusum  =  0.286864609176
phase_eta  =  0.163406160344
phi21  =  3.68958953205
phi31  =  4.54884157822
quartile31  =  0.3625
r21  =  0.460468301462
r31  =  0.276199645157
shapiro_w  =  0.866922318935
skewness  =  -0.929033411907
slope_per10  =  -0.13300877515
slope_per90  =  0.17327118684
stetson_k  =  0.708691498876
weighted_mean  =  12.8426744186
weighted_std  =  0.265121404479
