-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.73


######### Lightcurve features #########

amplitude  =  0.412948367859
cusum  =  0.185509950326
eta  =  0.853541131658
hl_amp_ratio  =  0.712909406922
kurtosis  =  2.14007710371
n_points  =  78
period  =  0.537150049466
period_SNR  =  12.6575308162
period_log10FAP  =  -5.2621537929
period_uncertainty  =  0.000130262411434
phase_cusum  =  0.239941565564
phase_eta  =  0.350198358694
phi21  =  3.8665756571
phi31  =  4.46385426278
quartile31  =  0.3175
r21  =  0.402475346765
r31  =  0.302320510943
shapiro_w  =  0.903903663158
skewness  =  -1.10548507613
slope_per10  =  -0.69321167491
slope_per90  =  0.421621650548
stetson_k  =  0.794117917192
weighted_mean  =  13.3515384615
weighted_std  =  0.213973859673
