-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.153529731477
cusum  =  0.342236173712
eta  =  1.67990704591
hl_amp_ratio  =  0.582391015244
kurtosis  =  -1.10671851468
n_points  =  16
period  =  0.116473271629
period_SNR  =  6.56160626206
period_log10FAP  =  0.0
period_uncertainty  =  6.4553162992e-06
phase_cusum  =  0.398724216026
phase_eta  =  0.99774580366
phi21  =  -0.697903279061
phi31  =  1.28025120104
quartile31  =  0.17
r21  =  0.075684442107
r31  =  0.1879458943
shapiro_w  =  0.941500306129
skewness  =  -0.322190531492
slope_per10  =  -0.245950000826
slope_per90  =  0.161338904552
stetson_k  =  0.818491287752
weighted_mean  =  15.3670028136
weighted_std  =  0.108473609949
