-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.333805714898
cusum  =  0.208859593692
eta  =  0.566458448967
hl_amp_ratio  =  0.462708336011
kurtosis  =  -0.448537319664
n_points  =  109
period  =  0.669178739739
period_SNR  =  14.6235168625
period_log10FAP  =  -9.11811517767
period_uncertainty  =  0.000129247467832
phase_cusum  =  0.259754080397
phase_eta  =  0.481079233824
phi21  =  -2.13751614427
phi31  =  -4.16965695043
quartile31  =  0.43
r21  =  0.366516592448
r31  =  0.25399045432
shapiro_w  =  0.947494983673
skewness  =  -0.448462014285
slope_per10  =  -0.248952584453
slope_per90  =  0.326333334669
stetson_k  =  0.73718613858
weighted_mean  =  15.6676555447
weighted_std  =  0.302450694872
