-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.36475595497
cusum  =  0.143216939699
eta  =  0.590581526944
hl_amp_ratio  =  0.504580192473
kurtosis  =  -0.539745809013
n_points  =  269
period  =  0.672837649193
period_SNR  =  32.9874230017
period_log10FAP  =  -33.5312737351
period_uncertainty  =  0.000129871385357
phase_cusum  =  0.270908559646
phase_eta  =  0.262625718486
phi21  =  0.934754321205
phi31  =  1.98184207153
quartile31  =  0.49
r21  =  0.44044590392
r31  =  0.254305537546
shapiro_w  =  0.940014541149
skewness  =  -0.644808786661
slope_per10  =  -0.197362745478
slope_per90  =  0.134999998845
stetson_k  =  0.79269229871
weighted_mean  =  12.0109937888
weighted_std  =  0.309911237481
