-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.97


######### Lightcurve features #########

amplitude  =  0.328294985637
cusum  =  0.091035575737
eta  =  0.654518915636
hl_amp_ratio  =  0.535608269832
kurtosis  =  -0.92740275122
n_points  =  276
period  =  0.648620071121
period_SNR  =  34.2227300593
period_log10FAP  =  -34.0715900514
period_uncertainty  =  0.000116499046484
phase_cusum  =  0.220382887019
phase_eta  =  0.143590138357
phi21  =  -2.26026750158
phi31  =  -0.937306004782
quartile31  =  0.565
r21  =  0.514398307745
r31  =  0.33957255501
shapiro_w  =  0.921178221703
skewness  =  -0.545296061427
slope_per10  =  -0.265506533889
slope_per90  =  0.266700005159
stetson_k  =  0.803158763584
weighted_mean  =  12.7966770186
weighted_std  =  0.309283204607
