-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.23


######### Lightcurve features #########

amplitude  =  0.572060383129
cusum  =  0.175146727008
eta  =  2.88085946496
hl_amp_ratio  =  4.33511231299
kurtosis  =  -1.20561882307
n_points  =  476
period  =  0.997289063444
period_SNR  =  20.4004008871
period_log10FAP  =  -1.26297623374
period_uncertainty  =  0.000334773137235
phase_cusum  =  0.121745127932
phase_eta  =  2.48584623746
phi21  =  0.770123455348
phi31  =  2.47169559872
quartile31  =  1.57
r21  =  0.404550486448
r31  =  0.402066479758
shapiro_w  =  0.78518474102
skewness  =  0.66312288244
slope_per10  =  -0.0155543794214
slope_per90  =  0.0158111770915
stetson_k  =  0.710586896696
weighted_mean  =  13.7870424494
weighted_std  =  0.769874405905
