-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.265383060919
cusum  =  0.267899442534
eta  =  0.638574877606
hl_amp_ratio  =  0.329836282526
kurtosis  =  0.2969305519
n_points  =  59
period  =  0.717409514041
period_SNR  =  7.4570491105
period_log10FAP  =  -3.12871119914
period_uncertainty  =  0.0001678805507
phase_cusum  =  0.279897107017
phase_eta  =  0.637881614973
phi21  =  0.233720703444
phi31  =  0.707436524122
quartile31  =  0.25
r21  =  0.441977195952
r31  =  0.401469088553
shapiro_w  =  0.851201534271
skewness  =  -1.1641500838
slope_per10  =  -0.297000007704
slope_per90  =  0.183200001096
stetson_k  =  0.668853064835
weighted_mean  =  16.3511978266
weighted_std  =  0.254286779054
