-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.309726099266
cusum  =  0.277521123515
eta  =  0.392811633825
hl_amp_ratio  =  0.460246363878
kurtosis  =  -0.728431207856
n_points  =  311
period  =  0.565236905581
period_SNR  =  40.9726161301
period_log10FAP  =  -39.8520199246
period_uncertainty  =  0.00014406446795
phase_cusum  =  0.242363806745
phase_eta  =  0.528802524398
phi21  =  0.447327287396
phi31  =  0.680991155852
quartile31  =  0.44
r21  =  0.318021718522
r31  =  0.216196490941
shapiro_w  =  0.937584936619
skewness  =  -0.586265792185
slope_per10  =  -0.0843318212935
slope_per90  =  0.0775931222722
stetson_k  =  0.777467005777
weighted_mean  =  12.3085521175
weighted_std  =  0.283220941104
